HKm n = 100 n = 200 Wilcoxon Normal Sign Wilcoxon Normal Sign Normal α = 1 0.173 0.253 0.082 0.117 0.203 0.070 α = 0.95 0.385 0.515 0.136 0.404 0.575 0.122 α = 0.9 0.576 0.698 0.196 0.686 0.816 0.222 α = 0.85 0.720 0.833 0.324 0.872 0.951 0.395 Student on 2 α = 1 0.101 0.118 0.074 0.077 0.091 0.066 α = 0.95 0.662 0.661 0.534 0.852 0.860 0.781 α = 0.9 0.848 0.869 0.684 0.981 0.972 0.932 α = 0.85 0.934 0.950 0.824 0.999 0.997 0.977 Student on 3 α = 1 0.123 0.162 0.086 0.081 0.103 0.068 α = 0.95 0.485 0.542 0.305 0.628 0.678 0.451 α = 0.9 0.705 0.754 0.469 0.913 0.917 0.726 α = 0.85 0.871 0.888 0.643 0.985 0.989 0.864 Student on 4 α = 1 0.123 0.160 0.089 0.090 0.124 0.066 α = 0.95 0.390 0.487 0.209 0.522 0.609 0.310 α = 0.9 0.681 0.734 0.404 0.833 0.880 0.558 α = 0.85 0.816 0.862 0.505 0.964 0.976 0.752

Table 1: Modified Test

HKu n = 100 n = 200 Wilcoxon Normal Sign Wilcoxon Normal Sign Normal α = 1 0.043 0.036 0.051 0.054 0.053 0.044 α = 0.95 0.101 0.096 0.084 0.277 0.288 0.218 α = 0.9 0.241 0.252 0.173 0.765 0.783 0.493 α = 0.85 0.482 0.468 0.318 0.968 0.977 0.747 Student on 2 α = 1 0.045 0.040 0.050 0.056 0.062 0.060 α = 0.95 0.505 0.392 0.504 0.897 0.835 0.843 α = 0.9 0.808 0.723 0.743 1.000 0.998 0.991 α = 0.85 0.930 0.886 0.880 1.000 1.000 0.998 Student on 3 α = 1 0.048 0.055 0.044 0.059 0.048 0.050 α = 0.95 0.244 0.191 0.258 0.641 0.535 0.528 α = 0.9 0.552 0.443 0.495 0.977 0.960 0.892 α = 0.85 0.804 0.723 0.702 1.000 1.000 0.986 Student on 4 α = 1 0.058 0.043 0.060 0.051 0.051 0.047 α = 0.95 0.173 0.134 0.160 0.486 0.397 0.407 α = 0.9 0.475 0.407 0.393 0.938 0.899 0.805 α = 0.85 0.714 0.643 0.564 0.995 0.994 0.952

Table 2: Unmodified Test